\documentclass[11pt,twoside]{article}\makeatletter

\IfFileExists{xcolor.sty}%
  {\RequirePackage{xcolor}}%
  {\RequirePackage{color}}
\usepackage{colortbl}
\usepackage{wrapfig}
\usepackage{ifxetex}
\ifxetex
  \usepackage{fontspec}
  \usepackage{xunicode}
  \catcode`⃥=\active \def⃥{\textbackslash}
  \catcode`❴=\active \def❴{\{}
  \catcode`❵=\active \def❵{\}}
  \def\textJapanese{\fontspec{Noto Sans CJK JP}}
  \def\textChinese{\fontspec{Noto Sans CJK SC}}
  \def\textKorean{\fontspec{Noto Sans CJK KR}}
  \setmonofont{DejaVu Sans Mono}
  
\else
  \IfFileExists{utf8x.def}%
   {\usepackage[utf8x]{inputenc}
      \PrerenderUnicode{–}
    }%
   {\usepackage[utf8]{inputenc}}
  \usepackage[english]{babel}
  \usepackage[T1]{fontenc}
  \usepackage{float}
  \usepackage[]{ucs}
  \uc@dclc{8421}{default}{\textbackslash }
  \uc@dclc{10100}{default}{\{}
  \uc@dclc{10101}{default}{\}}
  \uc@dclc{8491}{default}{\AA{}}
  \uc@dclc{8239}{default}{\,}
  \uc@dclc{20154}{default}{ }
  \uc@dclc{10148}{default}{>}
  \def\textschwa{\rotatebox{-90}{e}}
  \def\textJapanese{}
  \def\textChinese{}
  \IfFileExists{tipa.sty}{\usepackage{tipa}}{}
\fi
\def\exampleFont{\ttfamily\small}
\DeclareTextSymbol{\textpi}{OML}{25}
\usepackage{relsize}
\RequirePackage{array}
\def\@testpach{\@chclass
 \ifnum \@lastchclass=6 \@ne \@chnum \@ne \else
  \ifnum \@lastchclass=7 5 \else
   \ifnum \@lastchclass=8 \tw@ \else
    \ifnum \@lastchclass=9 \thr@@
   \else \z@
   \ifnum \@lastchclass = 10 \else
   \edef\@nextchar{\expandafter\string\@nextchar}%
   \@chnum
   \if \@nextchar c\z@ \else
    \if \@nextchar l\@ne \else
     \if \@nextchar r\tw@ \else
   \z@ \@chclass
   \if\@nextchar |\@ne \else
    \if \@nextchar !6 \else
     \if \@nextchar @7 \else
      \if \@nextchar (8 \else
       \if \@nextchar )9 \else
  10
  \@chnum
  \if \@nextchar m\thr@@\else
   \if \@nextchar p4 \else
    \if \@nextchar b5 \else
   \z@ \@chclass \z@ \@preamerr \z@ \fi \fi \fi \fi
   \fi \fi  \fi  \fi  \fi  \fi  \fi \fi \fi \fi \fi \fi}
\gdef\arraybackslash{\let\\=\@arraycr}
\def\@textsubscript#1{{\m@th\ensuremath{_{\mbox{\fontsize\sf@size\z@#1}}}}}
\def\Panel#1#2#3#4{\multicolumn{#3}{){\columncolor{#2}}#4}{#1}}
\def\abbr{}
\def\corr{}
\def\expan{}
\def\gap{}
\def\orig{}
\def\reg{}
\def\ref{}
\def\sic{}
\def\persName{}\def\name{}
\def\placeName{}
\def\orgName{}
\def\textcal#1{{\fontspec{Lucida Calligraphy}#1}}
\def\textgothic#1{{\fontspec{Lucida Blackletter}#1}}
\def\textlarge#1{{\large #1}}
\def\textoverbar#1{\ensuremath{\overline{#1}}}
\def\textquoted#1{‘#1’}
\def\textsmall#1{{\small #1}}
\def\textsubscript#1{\@textsubscript{\selectfont#1}}
\def\textxi{\ensuremath{\xi}}
\def\titlem{\itshape}
\newenvironment{biblfree}{}{\ifvmode\par\fi }
\newenvironment{bibl}{}{}
\newenvironment{byline}{\vskip6pt\itshape\fontsize{16pt}{18pt}\selectfont}{\par }
\newenvironment{citbibl}{}{\ifvmode\par\fi }
\newenvironment{docAuthor}{\ifvmode\vskip4pt\fontsize{16pt}{18pt}\selectfont\fi\itshape}{\ifvmode\par\fi }
\newenvironment{docDate}{}{\ifvmode\par\fi }
\newenvironment{docImprint}{\vskip 6pt}{\ifvmode\par\fi }
\newenvironment{docTitle}{\vskip6pt\bfseries\fontsize{22pt}{25pt}\selectfont}{\par }
\newenvironment{msHead}{\vskip 6pt}{\par}
\newenvironment{msItem}{\vskip 6pt}{\par}
\newenvironment{rubric}{}{}
\newenvironment{titlePart}{}{\par }

\newcolumntype{L}[1]{){\raggedright\arraybackslash}p{#1}}
\newcolumntype{C}[1]{){\centering\arraybackslash}p{#1}}
\newcolumntype{R}[1]{){\raggedleft\arraybackslash}p{#1}}
\newcolumntype{P}[1]{){\arraybackslash}p{#1}}
\newcolumntype{B}[1]{){\arraybackslash}b{#1}}
\newcolumntype{M}[1]{){\arraybackslash}m{#1}}
\definecolor{label}{gray}{0.75}
\def\unusedattribute#1{\sout{\textcolor{label}{#1}}}
\DeclareRobustCommand*{\xref}{\hyper@normalise\xref@}
\def\xref@#1#2{\hyper@linkurl{#2}{#1}}
\begingroup
\catcode`\_=\active
\gdef_#1{\ensuremath{\sb{\mathrm{#1}}}}
\endgroup
\mathcode`\_=\string"8000
\catcode`\_=12\relax

\usepackage[a4paper,twoside,lmargin=1in,rmargin=1in,tmargin=1in,bmargin=1in,marginparwidth=0.75in]{geometry}
\usepackage{framed}

\definecolor{shadecolor}{gray}{0.95}
\usepackage{longtable}
\usepackage[normalem]{ulem}
\usepackage{fancyvrb}
\usepackage{fancyhdr}
\usepackage{graphicx}
\usepackage{marginnote}

\renewcommand{\@cite}[1]{#1}


\renewcommand*{\marginfont}{\itshape\footnotesize}

\def\Gin@extensions{.pdf,.png,.jpg,.mps,.tif}

  \pagestyle{fancy}

\usepackage[pdftitle={Insulin Pump Therapy},
 pdfauthor={}]{hyperref}
\hyperbaseurl{}

	 \paperwidth210mm
	 \paperheight297mm
              
\def\@pnumwidth{1.55em}
\def\@tocrmarg {2.55em}
\def\@dotsep{4.5}
\setcounter{tocdepth}{3}
\clubpenalty=8000
\emergencystretch 3em
\hbadness=4000
\hyphenpenalty=400
\pretolerance=750
\tolerance=2000
\vbadness=4000
\widowpenalty=10000

\renewcommand\section{\@startsection {section}{1}{\z@}%
     {-1.75ex \@plus -0.5ex \@minus -.2ex}%
     {0.5ex \@plus .2ex}%
     {\reset@font\Large\bfseries}}
\renewcommand\subsection{\@startsection{subsection}{2}{\z@}%
     {-1.75ex\@plus -0.5ex \@minus- .2ex}%
     {0.5ex \@plus .2ex}%
     {\reset@font\Large}}
\renewcommand\subsubsection{\@startsection{subsubsection}{3}{\z@}%
     {-1.5ex\@plus -0.35ex \@minus -.2ex}%
     {0.5ex \@plus .2ex}%
     {\reset@font\large}}
\renewcommand\paragraph{\@startsection{paragraph}{4}{\z@}%
     {-1ex \@plus-0.35ex \@minus -0.2ex}%
     {0.5ex \@plus .2ex}%
     {\reset@font\normalsize}}
\renewcommand\subparagraph{\@startsection{subparagraph}{5}{\parindent}%
     {1.5ex \@plus1ex \@minus .2ex}%
     {-1em}%
     {\reset@font\normalsize\bfseries}}


\def\l@section#1#2{\addpenalty{\@secpenalty} \addvspace{1.0em plus 1pt}
 \@tempdima 1.5em \begingroup
 \parindent \z@ \rightskip \@pnumwidth 
 \parfillskip -\@pnumwidth 
 \bfseries \leavevmode #1\hfil \hbox to\@pnumwidth{\hss #2}\par
 \endgroup}
\def\l@subsection{\@dottedtocline{2}{1.5em}{2.3em}}
\def\l@subsubsection{\@dottedtocline{3}{3.8em}{3.2em}}
\def\l@paragraph{\@dottedtocline{4}{7.0em}{4.1em}}
\def\l@subparagraph{\@dottedtocline{5}{10em}{5em}}
\@ifundefined{c@section}{\newcounter{section}}{}
\@ifundefined{c@chapter}{\newcounter{chapter}}{}
\newif\if@mainmatter 
\@mainmattertrue
\def\chaptername{Chapter}
\def\frontmatter{%
  \pagenumbering{roman}
  \def\thechapter{\@roman\c@chapter}
  \def\theHchapter{\roman{chapter}}
  \def\thesection{\@roman\c@section}
  \def\theHsection{\roman{section}}
  \def\@chapapp{}%
}
\def\mainmatter{%
  \cleardoublepage
  \def\thechapter{\@arabic\c@chapter}
  \setcounter{chapter}{0}
  \setcounter{section}{0}
  \pagenumbering{arabic}
  \setcounter{secnumdepth}{6}
  \def\@chapapp{\chaptername}%
  \def\theHchapter{\arabic{chapter}}
  \def\thesection{\@arabic\c@section}
  \def\theHsection{\arabic{section}}
}
\def\backmatter{%
  \cleardoublepage
  \setcounter{chapter}{0}
  \setcounter{section}{0}
  \setcounter{secnumdepth}{2}
  \def\@chapapp{\appendixname}%
  \def\thechapter{\@Alph\c@chapter}
  \def\theHchapter{\Alph{chapter}}
  \appendix
}
\newenvironment{bibitemlist}[1]{%
   \list{\@biblabel{\@arabic\c@enumiv}}%
       {\settowidth\labelwidth{\@biblabel{#1}}%
        \leftmargin\labelwidth
        \advance\leftmargin\labelsep
        \@openbib@code
        \usecounter{enumiv}%
        \let\p@enumiv\@empty
        \renewcommand\theenumiv{\@arabic\c@enumiv}%
	}%
  \sloppy
  \clubpenalty4000
  \@clubpenalty \clubpenalty
  \widowpenalty4000%
  \sfcode`\.\@m}%
  {\def\@noitemerr
    {\@latex@warning{Empty `bibitemlist' environment}}%
    \endlist}

\def\tableofcontents{\section*{\contentsname}\@starttoc{toc}}
\parskip0pt
\parindent1em
\def\Panel#1#2#3#4{\multicolumn{#3}{){\columncolor{#2}}#4}{#1}}
\newenvironment{reflist}{%
  \begin{raggedright}\begin{list}{}
  {%
   \setlength{\topsep}{0pt}%
   \setlength{\rightmargin}{0.25in}%
   \setlength{\itemsep}{0pt}%
   \setlength{\itemindent}{0pt}%
   \setlength{\parskip}{0pt}%
   \setlength{\parsep}{2pt}%
   \def\makelabel##1{\itshape ##1}}%
  }
  {\end{list}\end{raggedright}}
\newenvironment{sansreflist}{%
  \begin{raggedright}\begin{list}{}
  {%
   \setlength{\topsep}{0pt}%
   \setlength{\rightmargin}{0.25in}%
   \setlength{\itemindent}{0pt}%
   \setlength{\parskip}{0pt}%
   \setlength{\itemsep}{0pt}%
   \setlength{\parsep}{2pt}%
   \def\makelabel##1{\upshape ##1}}%
  }
  {\end{list}\end{raggedright}}
\newenvironment{specHead}[2]%
 {\vspace{20pt}\hrule\vspace{10pt}%
  \phantomsection\label{#1}\markright{#2}%

  \pdfbookmark[2]{#2}{#1}%
  \hspace{-0.75in}{\bfseries\fontsize{16pt}{18pt}\selectfont#2}%
  }{}
      \def\TheFullDate{2021-03-15 (revised: 15 March 2021)}
\def\TheID{\makeatother }
\def\TheDate{2021-03-15}
\title{Insulin Pump Therapy}
\author{}\makeatletter 
\makeatletter
\newcommand*{\cleartoleftpage}{%
  \clearpage
    \if@twoside
    \ifodd\c@page
      \hbox{}\newpage
      \if@twocolumn
        \hbox{}\newpage
      \fi
    \fi
  \fi
}
\makeatother
\makeatletter
\thispagestyle{empty}
\markright{\@title}\markboth{\@title}{\@author}
\renewcommand\small{\@setfontsize\small{9pt}{11pt}\abovedisplayskip 8.5\p@ plus3\p@ minus4\p@
\belowdisplayskip \abovedisplayskip
\abovedisplayshortskip \z@ plus2\p@
\belowdisplayshortskip 4\p@ plus2\p@ minus2\p@
\def\@listi{\leftmargin\leftmargini
               \topsep 2\p@ plus1\p@ minus1\p@
               \parsep 2\p@ plus\p@ minus\p@
               \itemsep 1pt}
}
\makeatother
\fvset{frame=single,numberblanklines=false,xleftmargin=5mm,xrightmargin=5mm}
\fancyhf{} 
\setlength{\headheight}{14pt}
\fancyhead[LE]{\bfseries\leftmark} 
\fancyhead[RO]{\bfseries\rightmark} 
\fancyfoot[RO]{}
\fancyfoot[CO]{\thepage}
\fancyfoot[LO]{\TheID}
\fancyfoot[LE]{}
\fancyfoot[CE]{\thepage}
\fancyfoot[RE]{\TheID}
\hypersetup{citebordercolor=0.75 0.75 0.75,linkbordercolor=0.75 0.75 0.75,urlbordercolor=0.75 0.75 0.75,bookmarksnumbered=true}
\fancypagestyle{plain}{\fancyhead{}\renewcommand{\headrulewidth}{0pt}}

\date{}
\usepackage{authblk}

\providecommand{\keywords}[1]
{
\footnotesize
  \textbf{\textit{Index terms---}} #1
}

\usepackage{graphicx,xcolor}
\definecolor{GJBlue}{HTML}{273B81}
\definecolor{GJLightBlue}{HTML}{0A9DD9}
\definecolor{GJMediumGrey}{HTML}{6D6E70}
\definecolor{GJLightGrey}{HTML}{929497} 

\renewenvironment{abstract}{%
   \setlength{\parindent}{0pt}\raggedright
   \textcolor{GJMediumGrey}{\rule{\textwidth}{2pt}}
   \vskip16pt
   \textcolor{GJBlue}{\large\bfseries\abstractname\space}
}{%   
   \vskip8pt
   \textcolor{GJMediumGrey}{\rule{\textwidth}{2pt}}
   \vskip16pt
}

\usepackage[absolute,overlay]{textpos}

\makeatother 
      \usepackage{lineno}
      \linenumbers
      
\begin{document}

             \author[1]{Ismat Abdelrhman Alborhan  Mohammed}

\renewcommand\Authands{ and }

\date{\small \em Received: 9 February 2021 Accepted: 2 March 2021 Published: 15 March 2021}

\maketitle


\begin{abstract}
        


The conception of administer continuous insulin appeared in the United States in early 1960s. Dr Arnold Kadish was the first individual who intended the primary closed-loop insulin pump tool that functioned by administration of continuous insulin to the patient accompanied with automatic blood glucose detecting. Practically this device was unsuitable because of its oversize.[1] The earliest certified pump for marketable use accessible in 1983 was branded as Nordisk Infuser. In 1970s, Pickup and Keen practice transportable insulin pump device for CSII in type 1 diabetes mellitus individuals.[2][3] In the year 1976 the world saw the invention of first insulin pumps.[4] Recently insulin pumps manufactures shows more improvement. It became less in size and more practical for usage. The American Diabetes Association identify that CSII is as unhurt as multiple injection therapy, when suggested measures are monitored.[5]

\end{abstract}


\keywords{}

\begin{textblock*}{18cm}(1cm,1cm) % {block width} (coords) 
\textcolor{GJBlue}{\LARGE Global Journals \LaTeX\ JournalKaleidoscope\texttrademark}
\end{textblock*}

\begin{textblock*}{18cm}(1.4cm,1.5cm) % {block width} (coords) 
\textcolor{GJBlue}{\footnotesize \\ Artificial Intelligence formulated this projection for compatibility purposes from the original article published at Global Journals. However, this technology is currently in beta. \emph{Therefore, kindly ignore odd layouts, missed formulae, text, tables, or figures.}}
\end{textblock*}


\let\tabcellsep& 	 	 		 
\section[{Introduction}]{Introduction}\par
he conception of administer continuous insulin appeared in the United States in early 1960s. Dr Arnold Kadish was the first individual who intended the primary closed-loop insulin pump tool that functioned by administration of continuous insulin to the patient accompanied with automatic blood glucose detecting. Practically this device was unsuitable because of its oversize.  {\ref [} Patients demanding extraordinary insulin dose. 
\section[{Pregnancy complicated with diabetes}]{Pregnancy complicated with diabetes}\par
It is probable that approximately 375,000US patients use the insulin pump, with this figure likely to increase.[9] It has been used for more than 35 years. \hyperref[b0]{[10]} The FDA permitted Medtronic's MiniMed 530G with Enlite in 2013, under its novel Artificial Pancreas Device System-Threshold Suspend guidelines, as the earliest device that adjust insulin release in reaction to CGM sensor data. \hyperref[b1]{[11]} Threshold suspend means that when CGM sensor glucose levels decline below a specified threshold, the pump warnings and hangs insulin delivery for 2 hours. The usage of this device has been revealed to lessen nocturnal hypoglycaemia. \hyperref[b2]{[12]} Author: e-mail: ismat4me@sudamedica.com Exact Features of Patients Who Are Not Suitable Candidates for Insulin Pump Use:  {\ref [13]} Reluctant to implement MDI doses 3-4 daily, regular SMBG more than 4 daily and carbohydrate counting Absence of inspiration to accomplish close-fitting glucose control History of psychiatric disorders (e.g., psychosis, severe anxiety, or depression) Significant doubts about pump usage affecting lifestyle (e.g., contact sports or sexual activity) Impracticable hopes of pump therapy (e.g., faith that it reduces the need to be in charge for diabetes controlling) T 7 Year 2021 
\section[{Global Journal of}]{Global Journal of}\par
Indication of CSII for paediatric diabetic patients issued in 2006 in Berlin on conference attended by specialists in paediatrics diabetes: \hyperref[b3]{[14]} ? Raised HbA1c levels on injection remedy ? Recurrent, severe hypoglycaemia ? Usually unsettled glucose levels ? A management schedule that compromises lifestyle ? Microvascular and macrovascular complications Perfect nominees for paediatrics CSII include patients with interested relatives who are dedicated to observing blood glucose minimum 4 times per day and know show estimate bolus insulin doses. 
\section[{a) Insulin Pump Treatment for diabetes during Pregnancy}]{a) Insulin Pump Treatment for diabetes during Pregnancy}\par
Due to the fact that pregnancy is a state where hastened level of ketone bodies in the women. \hyperref[b4]{[15]} Minimum hours of insulin intermission can cause hyperglycaemia and ketosis. High ketone bodies during pregnancy lead to fetal death. \hyperref[b5]{[16]} There is no long acting insulin in the pump infusion, there for to be safe side a little dose of neutral protamine Hagedorn(NPH) or insulin detemir may be administered at night to guarantee that there will never be a deficiency of insulin in circulation if the needle get out.13 
\section[{Advantages and Disadvantages of Insulin Pump Therapy: [17][18][19][20]}]{Advantages and Disadvantages of Insulin Pump Therapy: [17][18][19][20]} 
\section[{Advantages Disadvantages}]{Advantages Disadvantages}\par
Improve  
\section[{Conclusion}]{Conclusion}\par
In diabetic patient, the ideal way to administer insulin is in away mimic pancreas releases it. The perfect method to administer it in that way is insulin pump more than any other methods.[23] Nowadays the growing acceptance of insulin pump treatment has positioned more responsibility on medical experts and nonmedical personnel who do not have diabetes speciality, like accident and emergency department, hospital staff and school teachers. This revolution necessitates that these specialist strain themselves with this form of insulin supply. \hyperref[b13]{[24]} \begin{figure}[htbp]
\noindent\textbf{} \par 
\begin{longtable}{P{0.25161887141535616\textwidth}P{0.5983811285846439\textwidth}}
\tabcellsep Recently insulin pumps manufactures shows more\\
\tabcellsep improvement. It became less in size and more practical\\
\tabcellsep for usage. The American Diabetes Association identify\\
\tabcellsep that CSII is as unhurt as multiple injection therapy, when\\
\tabcellsep suggested measures are monitored.[5] Insulin Pumps\\
\tabcellsep are undersized electronic devices which provide insulin\\
\tabcellsep by two approaches:[6]\\
\tabcellsep Basal Insulin, which is constant \& continuous\\
\tabcellsep calculated dosage.\\
\tabcellsep Bolus Insulin, which is a mealtime dose.\\
\tabcellsep Common indications and contraindications for\\
\tabcellsep insulin pump treatment in diabetic individuals:[7][8]\\
Indications\tabcellsep Contraindications\\
Repeated events of sever hypoglycaemia with\tabcellsep Diabetes with psychiatric disorders\\
multiple daily injections\tabcellsep \\
Patient failure to hits HbA1c goal inspite of MDI\tabcellsep Reluctance to self-monitor of blood sugar\\
and HbA1c remains ? 8.5\%.\tabcellsep \\
Individual with diabetic complications such as\tabcellsep shortage of time and motivation to maintain\\
neuropathy, nephropathy\tabcellsep lycaemic control\\
Patient with considerable dawn phenomenon\tabcellsep Cannot be proficient on crucial practical part of\\
\tabcellsep insulin pump treatment\\
Diabetes individual looking for improved quality of\tabcellsep \\
life.\tabcellsep \end{longtable} \par
 
\caption{\label{tab_0}}\end{figure}
 			\footnote{© 2021 Global Journals} 		 		\backmatter  			 			 			  				\begin{bibitemlist}{1}
\bibitem[A Primary Care Approach to Continuous Subcutaneous Insulin Infusion ()]{b11}\label{b11} 	 		\textit{A Primary Care Approach to Continuous Subcutaneous Insulin Infusion},  		2015.  	 	 (Internet. cited) 
\bibitem[Buchanan et al. ()]{b4}\label{b4} 	 		‘Accelerated starvation in late pregnancy: a comparison between obese women with and without gestational diabetes mellitus’.  		 			T A Buchanan 		,  		 			B E Metzger 		,  		 			Freinke Ln 		.  	 	 		\textit{AmJObstetGynecol}  		1990. 162 p. .  	 
\bibitem[Jul29]{b12}\label{b12} 	 		\textit{Basics of Insulin Pump Therapy},  		 			Jul29 		.  		 \url{https://www.medtronicdiabetes.com/sites/default/files/library/support/BasicsofInsulinPumpTherapy.pdf}  		 	 
\bibitem[Bruttomesso et al. ()]{b0}\label{b0} 	 		‘Continuous subcutaneous insulin infusion (CSII) 30 years later: still the best option for insulin therapy’.  		 			D Bruttomesso 		,  		 			S Costa 		,  		 			A Baritussio 		.  	 	 		\textit{Diabetes Metab Res Rev}  		2009. 25 p. .  	 
\bibitem[Continuous subcutaneous insulin infusion for the treatment of diabetes mellitus|Guidance and guidelines|NICE.NICE]{b8}\label{b8} 	 		\textit{Continuous subcutaneous insulin infusion for the treatment of diabetes mellitus|Guidance and guidelines|NICE.NICE},  		 \url{https://www.nice.org.uk/guidance/ta151}  		 	 
\bibitem[Jovanovic et al. ()]{b5}\label{b5} 	 		‘Effect of euglycemia on the outcome of pregnancy in insulindependent diabetic women as compared with normal control subjects’.  		 			L Jovanovic 		,  		 			M Druzin 		,  		 			C M Peterson 		.  	 	 		\textit{Am J Med}  		1981. 71 p. .  	 
\bibitem[Boyle et al. ()]{b13}\label{b13} 	 		‘Guidelines for application of continuous subcutaneous insulin infusion(insulin pump) therapy in the perioperative period’.  		 			M E Boyle 		,  		 			K M Seifert 		,  		 			K A Beer 		.  	 	 		\textit{JDiabetesSciTechnol}  		2012. 6 p. .  	 
\bibitem[Management of type1 diabetes mellitus in children and adolescents (2015)]{b7}\label{b7} 	 		 \url{http://www.uptodate.com.abc.cardiff.ac.uk/contents/management-of-type-1-diab-etes-mellitus-in-children-and-adolescents?source=preview\&search=first+Insulin+pump\&language=en-US\&anchor=H21\&selectedTitle=2\textasciitilde 150\#H21}  		\textit{Management of type1 diabetes mellitus in children and adolescents},  				2015 Jul 14.  	 	 (Internet) 
\bibitem[
			U
		]{b1}\label{b1} 	 		\textit{MiniMed 530GFDA Approval Letter},  		 			U 		.  		 \url{http://www.accessdata.fda.gov/cdrh\textunderscore docs/pdf12/p120010a.pdf2013}  		 	 	 (Food and Drug Administration) 
\bibitem[Model of care document ()]{b9}\label{b9} 	 		\textit{Model of care document},  		2015.  	 	 (cited) 
\bibitem[Bode et al. ()]{b10}\label{b10} 	 		‘Pumping Protocol: A Guide to Insulin Pump Initiation’.  		 			B W Bode 		,  		 			J Kyllo 		,  		 			F R Kaufman 		.  	 	 		\textit{Medical Education Academia}  		2013.  	 
\bibitem[The Living Textbook of Diabetes CSII: benefits and drawbacks-Management-Diapedia (2015)]{b6}\label{b6} 	 		‘The Living Textbook of Diabetes’.  		 \url{http://www.diapedia.org/management/csii-benefits-and-drawbacks}  	 	 		\textit{CSII: benefits and drawbacks-Management-Diapedia},  				2015 Jul 15.  	 	 (Internet) 
\bibitem[Bergenstal et al. ()]{b2}\label{b2} 	 		‘Threshold-based insulin-pump interruption for reduction of hypoglycemia’.  		 			R M Bergenstal 		,  		 			D C Klonoff 		,  		 			S K Garg 		.  	 	 		\textit{NEnglJMed}  		2013. 369 p. .  	 
\bibitem[Phillip et al.]{b3}\label{b3} 	 		\textit{Use of insulin pump therapy in the pediatric age-group: consensus statement from the European Society for Paediatric Endocrinology, the Laws on Wilkins Pediatric Endocrine Society, and the International Society for Pediatric and Adolescent Diabetes, endors. Diabetes Care},  		 			M Phillip 		,  		 			T Battelino 		,  		 			H Rodriguez 		,  		 			T Danne 		,  		 			F Kaufman 		.  		 \url{http://care.diabetesjournals.org/content/30/6/1653.long}  		30 p. .  	 	 (Internet]. 2007Jun1[cited2015Aug5) 
\end{bibitemlist}
 			 		 	 
\end{document}
